define_inh
int_table
interrupt0
interrupt1
interrupt2
interrupt3
interrupt4
interrupt5
interrupt6
interrupt7
interrupt8
interrupt9
interrupt10
interrupt11
interrupt12
interrupt13
interrupt14
interrupt15
stack
